0 0.2 0.4 0.6 0.8 1 1.2

0 0.05 0.1 0.15 0.2 0.25 x 10^{-4}

Ο10Ψ CL domain

QCD FA (+ SM fit)

Exp. upper limit

BR(B^05π^0π^0)

Confidence level using C_{ππ}ΜBABARΝ

0 0.2 0.4 0.6 0.8 1

0 0.05 0.1 x 10^{-5}

Ο10Ψ CL

CKM_{f i t t e r}