-1.5

-1

-0.5

0

0.5

1

1.5

-1 -0.5 0 0.5 1 1.5 2 0 0.01

0.02

0.03

0.04

0.05

0.06

0.07

0.08

0.09 0.1

zoom

Standard CKM fit

ρ η

QCD FA (Belle) confidence level

CKM_{f i t t e r} RωD P/T from BBNS