ρ -1 -0.5 0 0.5 1 1.5 2

η

-1.5

-1

-0.5

0

0.5

1

1.5

ρ η

0

1 shaded areas have CL>0.05, 0.32, 0.90

ICHEP 2006

CKM_{f i t t e r}

CKM fit

, KK in SU(3) π , K ππ→B