)^0π_s S(K -1 -0.8 -0.6 -0.4 -0.2 -0 0.2 0.4 0.6 0.8 1

nR

0

0.2

0.4

0.6

0.8

1

1.2

0

1

0

1

1.2^{shaded areas have CL>0.05, 0.32, 0.90}

ICHEP 2006

CKM_{f i t t e r}