0

0.2

0.4

0.6

0.8

1

1.2

0 20 40 60 80 100 120 140 160 180

CKM fit

no α meas. in fit

B5ρρ (WA) WA ω B5ρ^+ρ^{-/0} (Babar) WA ω B5ρ^+ρ^{-/0} (Belle)

α (deg)

1 – CL

CKM_{f i t t e r}

Beauty06