0

0.2

0.4

0.6

0.8

1

1.2

0.16 0.18 0.2 0.22 0.24 0.26 0.28 0.3

ξ_{Δm(d,s),SU(3)} = 1.21^{+0.047}_{– 0.035} (hep-lat/0510113)

BRs WA - ξ_{Vγ,SU(3)} = 1.17 Α 0.09 (hep-ph/0603232)

CKM fit w/o Δm_s CDF measurement BR(B^05ρ^0γ)/BR(B^05K*^0γ)

|V_{td}/V_{ts}|

1 – CL

WA CKM_{f i t t e r}

BEAUTY 06