ρ -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

η

0 0.1 0.2 0.3 0.4 0.5 0.6

2ϕ

1ϕ 3ϕ ρ η

0

0.6 BEAUTY 2006

CKM_{f i t t e r}

)_2ϕ(_3ϕ

cb /V ubV

excluded area has CL > 0.95