-150

-100 -50 0 50 100 150

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 1.8 2

BABAR

Belle

Average

Contoured zones have CLΓ0.05

(R_t/R_u)ΒP^{+–}/T^{+–}Β arg(P^{+–}/T^{+–}) (deg)

CKM_{f i t t e r}

Winter 2004