0

0.2

0.4

0.6

0.8

1

1.2

0 20 40 60 80 100 120 140 160 180

B5ππ (S/C_{+–} from BABAR) B5ππ (S/A_{+–} from Belle) Isospin an. no C/A_{00}

CKM fit

no α meas. in fit

α (deg)

1 – CL

CKM_{f i t t e r}

EPS 2005