0

0.2

0.4

0.6

0.8

1

1.2

12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

CKM fit w/o Δm_s CDF measurement

Δm_s

1 – CL

CKM_{f i t t e r}

FPCP 06