-1.5

-1

-0.5

0

0.5

1

1.5

-1 -0.5 0 0.5 1 1.5 2 sin2ϕ_1

sol. w/ cos2ϕ_1Λ0 (excl. at CLΓ0.95) excluded at CLΓ0.95

ϕ_3

ϕ_3 ϕ_2

ϕ_2

Δm_d Δm_sωΔm_d

ε_K

ε_K

ΒV_{ub}/V_{cb}Β ϕ_2 ϕ_1 ϕ_3

ρ η

excluded area has CLΓ0.95

CKM_{f i t t e r}

FPCP 06