0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9

sh 0 0.5 1 1.5 2 2.5 3

sσ

0

0.5

1

1.5

2

2.5

3 1-CL

0

1

2

3 FPCP 2007

CKM_{f i t t e r}