Observable central ± CL ≡ 1σ ± CL ≡ 2σ ± CL ≡ 3σ λ 0.2259^{+0.0029}_{−0.0028}^{+0.0048}_{−0.0036}^{+0.0052}_{−0.0040} A 0.806^{+0.032}_{−0.023}^{+0.066}_{−0.045}^{+0.082}_{−0.059} ρ̄ 0.214^{+0.049}_{−0.057}^{+0.153}_{−0.109}^{+0.195}_{−0.156} η̄ 0.337^{+0.030}_{−0.024}^{+0.064}_{−0.069}^{+0.098}_{−0.097} J [10^{−5}] 2.91^{+0.30}_{−0.23}^{+0.71}_{−0.60}^{+1.03}_{−0.77} sin 2α −0.32^{+0.30}_{−0.21}^{+0.57}_{−0.55}^{+0.80}_{−0.64} sin 2α (meas. not in fit) −0.29^{+0.56}_{−0.47}^{+0.79}_{−0.65}^{+0.96}_{−0.69} sin 2β 0.725^{+0.037}_{−0.036}^{+0.073}_{−0.073}^{+0.109}_{−0.109} sin 2β (meas. not in fit) 0.70^{+0.14}_{−0.10}^{+0.16}_{−0.17}^{+0.18}_{−0.22} α (deg) 99.2^{+6.7}_{−8.6}^{+20.8}_{−16.6}^{+27.8}_{−23.6} α (deg) (meas. not in fit) 98^{+16}_{−16}^{+26}_{−23}^{+31}_{−29} β (deg) 23.2^{+1.6}_{−1.5}^{+3.2}_{−2.9}^{+5.0}_{−4.2} γ ≃ δ_{PDG} (deg) 57.5^{+8.7}_{−6.8}^{+16.7}_{−20.6}^{+23.8}_{−26.3}

Table 1: Results of the global CKM fit as of ICHEP 2004, Beijing, China.