0 0.2 0.4 0.6 0.8 1 1.2

-80 -60 -40 -20 0 20 40 60 80

B5ππ (no C_{00}) B5ππ (with C_{00})

α – α_{eff} (deg)

Confidence level

CKM_{f i t t e r}

ICHEP 2004