Rfit Bayesian (Gauss) Bayesian (uniform)

sin2β_{BABAR}

sin2β_{Belle} sin2β_{WA}

sin2β

Confidence Level

0 0.2 0.4 0.6 0.8 1 1.2 1.4

-0.25 0 0.25 0.5 0.75 1