Figure 1: Confidence levels in the (ρ̄, η̄) plane for the individual constraints. The upper right hand plot shows in addition to Δm_d the improved constraint from Δm_s via ξ on Δm_d. The shaded areas indicate the regions of ˘ 90%, ˘ 32% and ˘ 5% CLs, respectively. The CLs have to be interpreted as upper bounds for the optimal set of theoretical parameters at a given point in the (ρ̄, η̄) plane.