Figure 3: Confidence levels in the (sin2α, sin2β) plane for the global CKM fit. The shaded areas indicate the regions of ˘ 90%, ˘ 32% and ˘ 5% CLs, respectively. Also shown are the 5% CL contours of the individual constraints. The ˘ 32% and ˘ 5% CL constraints from the world average of the sin2β measurements, not entering the global fit, are given by the dashed areas.