Figure 6: Confidence levels of the new sin2β measurements of BABAR and BELLE together with the world average. These are compared to the indirect SM constraints obtained from Rfit in this work (dashed line). Also shown are the results from the integrated PDFs obtained in the Bayesian analysis using Gaussian and uniform PDFs for the systematic theoretical errors.