0 0.2 0.4 0.6 0.8 1 1.2

0 20 40 60 80 100 120 140 160 180

B5ππ

B5ρρ B5ρρ (σ(S,C)=0) CKM fit (w/o ππ, ρρ)

α (deg)

Confidence level

SU(2) analysis of ππ, ρρ systems (BABAR - P_{EW} incl.)

CKM_{f i t t e r}

Winter 2004