0 0.2 0.4 0.6 0.8 1 1.2

0 20 40 60 80 100 120 140 160 180

SU(2) SU(3)

P^{+–}=P(K^0π^+) QCD FA CKM fit

α (deg)

Confidence level

CKM_{f i t t e r}

LP 2003