-1.5

-1

-0.5

0

0.5

1

1.5

-1 -0.5 0 0.5 1 1.5 2 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

γ β α

Standard CKM fit (Γ 0.05 CL)

ρ η

Constraint from B^0 5 π^+π^– (QCD FA) confidence level

CKM_{f i t t e r}

LP 2003