-1 -0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

SU(2)

SU(3)

QCD FA (BBNS)

Belle

S_{ππ}

C_{ππ}

CKM_{f i t t e r}

LP 2003

excluded area has Λ 0.05 CL