0 0.2 0.4 0.6 0.8 1 1.2 1.4

-1 -0.8 -0.6 -0.4 -0.2 0 0.2 0.4 0.6 0.8 1

Exp. average CKM fit (w/o sin2β)

BABAR Belle

sin2β

CL ϕK_S

CKM_{f i t t e r}

Winter 2004