-1.5

-1

-0.5

0

0.5

1

1.5

-1 -0.5 0 0.5 1 1.5 2 sin2β α β γ

Standard CKM Fit

ρ η

shaded areas have CLΓ0.05, 0.32, 0.90

cos(2β) from B^05J/ψK*

CKM_{f i t t e r}

Winter 2004