]^{-9}

) [10 μμ →_s

Br(B

2.8 3.0 3.2 3.4 3.6 3.8 4.0 4.2

p-value

0.0

0.2

0.4

0.6

0.8

1.0

FPCP 13

CKM_{f i t t e r s}mΔ

Prediction w/o sB Prediction w/o f Prediction