GLW+ADS

)_Dδ

GLW+ADS (no

naive statistical treatment (for illustrative purpose only)

Belle

γ 0 20 40 60 80 100 120 140 160 180

)π(K_Dδ

0

50

100

150

200

250

300

350_{excluded area has CL > 0.95}

FPCP 13

CKM_{f i t t e r}