5 ) 10 ν e → BR(K

1.50 1.55 1.60 1.65 1.70

)νμ→ BR(K

0.620

0.625

0.630

0.635

0.640

0.645

0.650

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0 p-value

FPCP 13

CKM_{f i t t e r}