γ α α dmΔ

Kε

Kε smΔ & _dmΔ ubV β sin 2

excluded at CL > 0.95

tcρ -0.15 -0.10 -0.05 -0.00 0.05

tcη

-0.10

-0.05

0.00

0.05

0.10_{excluded area has CL > 0.95}

ICHEP 16

CKM_{f i t t e r}