β sin 2

0.50 0.55 0.60 0.65 0.70 0.75 0.80 0.85 0.90

SL|_{ub} |V

0.0025

0.0030

0.0035

0.0040

0.0045

0.0050

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0 p-value

ICHEP 16

CKM_{f i t t e r}