dBB 0.0 0.2 0.4 0.6 0.8 1.0 1.2 1.4 1.6 1.8 2.0

p-value

0.0

0.2

0.4

0.6

0.8

1.0

Winter 12

CKM_{f i t t e r dB}

Prediction for B Lattice value