Belle

BABAR LHCb WA

1.0 − 0.8− 0.6− 0.4− 0.2− 0.0 0.2 ππ +-C 1.0 −

0.8 −

0.6 −

0.4 −

0.2 −

0.0

0.2 ππ +-S

excluded area has CL > 0.95

Spring 21

CKM_{f i t t e r}