fL00

0.0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1.0

p-value

0.0

0.2

0.4

0.6

0.8

1.0

CKM12 (prel.)

CKM_{f i t t e r} fL00 measurement (Babar) fL00 measurement (Belle) fL00 (meas. not in fit)