SLA -0.020 -0.015 -0.010 -0.005 0.000 0.005 0.010 0.015 0.020

p-value

0.0

0.2

0.4

0.6

0.8

1.0

EPS 11

CKM_{f i t t e r}

mixing qB-_q indirect fit prediction with NP in B

)^{-1} average (2.9 fb sϕ TeVatron

)^{-1}

D0 (9 fb )^{-1}

CDF (1.6 fb

SM (pred)