3ϕ

2ϕ dmΔ

Kε

Kε

smΔ & _dmΔ ubV

1ϕ sin 2

excluded at CL > 0.95

cuρ 0.997 0.998 0.999 1.000 1.001 1.002 1.003

cuη

-0.003

-0.002

-0.001

0.000

0.001

0.002

0.003_{excluded area has CL > 0.95}

Phase II

CKM_{f i t t e r}